




This disk contains a version of the Opus Trilogy software that you may
copy and distribute.  This version allows you and others a chance to evaluate
the features of the Trilogy software without paying.

To print an abbreviated version of the manual, start the Trilogy program and
select "WORD PROCESSING".  Then select "Get different document" and choose
the "TRILOGY1" document.  You can now either read the manual by pressing
"PAGE UP" and "PAGE DOWN", or use the "ALT P" command to print out this
portion of the manual on paper.  Repeat this process for the documents
"TRILOGY2", "TRILOGY3", and "TRILOGY4".  The document "FEATURES" has a brief
description of the major features of the Trilogy program, and the "UPDATES"
document describes the latest changes and additions to the Trilogy software.
There are messages at the top and bottom of every screen in Trilogy to help
you use the program.

If you wish to install the Opus Trilogy software on a hard disk drive, then
press CTRL-BREAK, answer "Y" to "TERMINATE BATCH JOB", and type "HINSTALL".

If you need a copy of this screen to refer to, simply turn on your printer and
press the PRT SC (print screen) key on your keyboard.  Some keyboards require
you to press the SHIFT key to get the PRT SC command (otherwise you are
pressing the *).

If you wish to start using the Opus Trilogy software, then
